24% of scatter points in NE quadrant

51% of scatter points in NW quadrant

7% of scatter points in SE quadrant

18% of scatter points in SW quadrant

-20000

020000

40000

60000

Difference in cost (£)

-.50.5Difference in outcome

£20k/QALY threshold line

95% confidence ellipse